0.1

1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

2

3

4 T(s)

1

10

100

2

3

4

5 6 7 8 9

20

30

40

50 60 70 80 90

200 H(m)

100

1000

50

60

70

80

90

200

300

400

500

600

700

800

900 V_s (m/s)

10

100

1000

5 6 7 8 9

20

30

40

50 60 70 80 90

200

300

400

500 600 700 800 900

2000

G(MPa)

1

10

0.3

0.4

0.5

0.6

0.7

0.8

0.9

2

3

4

5

6

7

8

9

f (Hz)